Copyright: Tides & currents for Windows ©Nautical Software (503) 579-1414, www.tides.com
Citation: Tides & currents for Windows ©Nautical Software (503) 579-1414, www.tides.com


DEFAULT TOPIC TITLE
This is a context-sensitive Help file that is called from an application.


Closes this dialog and saves any changes you have made.


Check this box to set all open windows to this date


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made.


Click this button for more information


Use this control to select the desired date


This is the tip of the day


Closes this dialog


Click this button to display the next tip


Click this button to display the previous tip


Click this button to display help


Uncheck this box to stop displaying tips


Choose a menu item to create a  shortcut for.


Click this button to create a shortcut for the selected menu item


This is a description of the selected shortcut


This is a list of the shortcuts already defined


Click this button remove this shortcut


Closes this dialog and saves any changes you have made.


Closes this dialog without saving any changes you have made.


Click this button to remove all keyboard shortcuts


Press the key(s) you wish to use for this shortcut


The state of this particular shortcut.


The state of this particular shortcut.


Closes this dialog and saves any changes you have made.


Closes this dialog without saving any changes you have made.


These are the toolbar buttons available


Choose a category from the list


Toolbar button description


A list of available toolbars


Click this button to close this dialog


Click this button to create a new toolbar


Click this button to customize your toolbars.


Click this button to reset your toolbars to their original state


Click this button to display help about this dialog


The name of the toolbar


The name of the toolbar


Check this box to display tooltips on your toolbar


Check this box to display the new "Cool Look" buttons


Check this box to display large toolbar buttons


Enter the name of the new toolbar here


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button for more information


Choose a toolbar form the list


Check this box to display tooltips on your toolbar


Check this box to display the new "Cool Look" buttons


Check this box to display large toolbar buttons


Click this button to create a new toolbar


Click this button to reset your toolbars to their original state


The name of the toolbar


The name of the toolbar


About this program


Other Copyright information


Program expiration date


Information regarding who this product is licensed to


The name of the registered user


The company of the registered user


The serial number for this copy of the program


The amount of memory available on your system


The amount of memory available on your system


Click this button to leave this dialog


Nice Picture!!!


Choose the locations you wish to add from this list


Click this button to add the selected items to the real time window.


Click this button to exit the dialog without performing any actions


Click this button to select all of the entries in the list


Important inchoation


Use these options to set colors on the graph


This is a list of the existing color schemes.


Click this button to save the current color scheme


Click this button to remove the currently selected color scheme from the list


Click this button to select a new color for daylight hours


The currently selected color


Click this button to select a new color for night time hours


The currently selected color


Click this button to select a new color for items in the normal range


The currently selected color


Click this button to select a new color for items above the normal range


The currently selected color


Click this button to select a new color for items below the normal range


The currently selected color


Click this button to select a new color for the above / below range lines


The currently selected color


Click this button to select a new color for the grid


The currently selected color


Closes this dialog and saves any changes you have made.


Closes this dialog without saving any changes you have made.


Click this button to display more information about this dialog


These options control general program operation


Select this button to display time in a 12 hour format


Select this button to display time in a 24 hour format


Select this button to display heights in feet


Select this button to display heights in centimeters


Select this button to display speeds in knots


Select this button to display speeds in meters / sec


If checked, the Next / Prev commands affect all open window


Check this box to enable the program to take daylight saving time into account


Check this box to have the program guide you through setting up certain program features


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button for more information


Check this button to include the date in the title bar of windows


Click this button edit the layout of the toolbars in the program


Click this button edit the keyboard shortcuts in the program


These settings affect how time is displayed


These settings affect how heights are displayed


These settings affect how velocities are displayed


These options control how the graphs look


Check this box to display a grid on the graph


Check this box to display a grid on the weekly graph


Check this box to display a high range line on the graph


Check this box to display a low range line on the graph


Click this button to change the way the tide range lines are displayed


Click this button to change the way the current range lines are displayed


This is a sample of the font used on the graph


Check this box to use a user defined slack water value


Enter your slack water value here


Check this box to display summary information by default


Check this box to display weekly information by default


Check this box to display the tide table by default


This is the interval used in the tide table


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button select a new font


Click this button for more information


These settings control what is displayed on the graph


This is a sample of the font used on this graph


These are the units the slack water value is specified in


Use these options to control how the program behaves when it is started


Select this box to have the program start in a maximized state


Select this box to have the program start in a minimized state


Select this box to have the program remember it's size and location


Check this box to require the user to manually close the caution window


Check this box to have the Welcome window displayed


Check this box to have the program re-open the locations used previously


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button for more information


These settings affect the size of the program window when the program is started


Select this box to use the average maximum flood


Select this box to use your own values


Enter the flood speed


Enter the flood speed


The units the speed is in


Enter your desired label


Enter your desired label


Select this box to use the average maximum ebb


Select this box to use your own values


Enter the ebb speed


Enter the ebb speed


The units the speed is in


Enter your desired label


Enter your desired label


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button for more information


These selections affect the high range value line


These selections affect the low range value in


Select this box if you want to select your location from a list of currently opened locations


Select this box if you want to select the location from the normal selection list


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Choose how you want to select an existing location


Choose how you want to select an existing location


Enter the name of your custom current location


This is the current station that your custom station is based on


Check this box to use the values specified below.  If unchecked, these values will be ignored in the calculations


Check this box to use the values specified below.  If unchecked, these values will be ignored in the calculations


Check this box to use the values specified below.  If unchecked, these values will be ignored in the calculations


Check this box to use the values specified below.  If unchecked, these values will be ignored in the calculations


Positive values are added, negative ones subtracted


Enter the desired time offset here


Positive values are added, negative ones subtracted


Enter the desired time offset here


Positive values are added, negative ones subtracted


Enter the desired time offset here


Positive values are added, negative ones subtracted


Enter the desired time offset here


Enter the desired directional offset


Enter the desired directional offset


Enter the desired directional offset


Enter the desired directional offset


Enter the velocity change in this box


The units this velocity is measured in


Enter the velocity change in this box


The units this velocity is measured in


Enter the velocity change in this box


The units this velocity is measured in


Enter the velocity change in this box


The units this velocity is measured in


The Flood / Ebb values are multiplied by this value


The Flood / Ebb values are multiplied by this value


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button to select a different station to base your custom current on.


Click this button for more information


This is the latitude of the custom location


This is the longitude of the custom location


This is the current station that your custom station is based on


these values are the Latitude and Longitude of the custom location


These are the corrections that are applied to the reference station to produce your custom current


A list of custom locations


The number of custom locations


A list of custom locations


Moves the selected location up the list


Moves the selected location up the list


Closes this dialog and saves any changes you have made.


Closes this dialog without saving any changes you have made.


Click this button to display help about this dialog


Click this button to edit the selected current


Click this button to Create a new custom location


Click this button to add a new section marker to the list


Click this button to delete the selected location


Enter the desired sanction name here


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Choose an item from this list of currently open locations


Closes this dialog and saves any changes you have made.


Closes this dialog without saving any changes you have made.


Enter the name of your custom tide location here


This is the reference station that your custom station is based on


The amount of time to add to or subtract from the high water time at the reference station


If positive, the time is added to the reference value, if negative, the time is subtracted


Uncheck this box if you do not want to use this correction value


The amount of time to add to or subtract from the low water time at the reference station


If positive, the time is added to the reference value, if negative, the time is subtracted


Uncheck this box if you do not want to use this correction value


The number of feet to add to the high tide value of the reference station


Uncheck this box if you do not want to use this correction value


The number of feet to add to the low tide value of the reference station


Uncheck this box if you do not want to use this correction value


This ratio is applied to the high water value


Uncheck this box if you do not want to use this correction value


This ratio is applied to the low water value


Uncheck this box if you do not want to use this correction value


Closes this dialog and saves any changes you have mad


Closes this dialog without saving any changes you have made


Click this button to select a new reference station to base your custom location on


Click this button for more information


The amount of time to add to or subtract from the high water time at the reference station


The amount of time to add to or subtract from the low water time at the reference station


The number of feet to add to the high tide value of the reference station


The number of feet to add to the low tide value of the reference station


This ratio is applied to the high water value


This ratio is applied to the low water value


This is the latitude of your custom position


This is the longitude of your custom position


This is the reference station that your custom station is based on


These settings control the corrections applied to the reference station data to give you your custom data


Times are expressed in hours and minutes


The units the height values are displayed in


These ratios are applied to the high and low water values


These values are the latitude and longitude of your custom position


This is the latitude of your custom position


Check this box to enable daylight savings corrections


Select the amount of correction to apply


Select the amount of correction to apply


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Important information


Important information


Uncheck this box if you do not want to view this screen each time you start the program


Click this button if you agree with the agreement


Click this button if you do not agree with the agreement


When your copy of Tides & Currents expires


Important message


Important message


Click this button to be reminded in 5 days


Click this button to close the dialog


Choose the location to export data from


Select this box to export data to a window


Select this box to export data to a clipboard


Select this box to export data to a file


Enter the name of the export file


Select the starting date of the information you wish to export


Select the ending date of the information you wish to export


These entries let you select the type of tide information you want exported


Select this box to export high and low tide information


Select this box to export tide information based on time


Choose the desired time interval


Check this button to include a header when exporting data to the clipboard or a file


This is a list of possible data items to export


Enter the number of times you wish the data to be repeated


Click this button to copy the selected source field into the target field list


Click this button to clear the selected target field entry


Click this button to clear the entire target field list


This is a list of data to be exported


Click this button export the requested data


Closes this dialog without exporting any data


Click this button select  the location for the exported data file


Click this button for more export options


Click this button for more information


Enter the desired group name here


Closes this dialog and saves any changes you have made.


Closes this dialog without saving any changes you have made.


This is the number of groups defined


This is the list of currently defined groups


Click this button to create a new group


Click this button to make changes to an existing group


Click this button to delete the selected group


If this box is checked, all currently opened windows will be closed before the items in the group is opened.


Important information


Click this button to open the selected group


Click this button to exit this dialog


Click this button for more information


This is the currently selected group


Select this box to add new locations to the selected group


Select this box to replace the contents of the group with your new selections


Important information


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


This is the currently selected group


These entries allow you to select how to modify the group


Important information


Click YES to view these notes


Click this button to exit the dialog


Click YES to view these notes


Click this button to exit this dialog


Select this button to open a tide window


Select this button to open a current window


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Select this button to open a textual window


What type of window would you like to open


Click YES to configure the Real Time window


Click this button to exit this dialog


Select YES to view the notes


Click this button to exit this dialog


This is a list of the currently installed regions and their expiration dates


Click this button to exit this dialog


Important information


Important information


The latitude you entered had a bad format


The latitude you entered had a bad format


The latitude you entered had an invalid direction


The latitude you entered was too large


Choose the region you wish to display locations for.


The number of locations in this region


This is a list of available locations in the region.  Select the ones you wish to display.


Information about the last selected location


The type of station selected.


The type of station selected.


The latitude of the selected station.


The latitude of the selected station.


The longitude of the selected station.


The longitude of the selected station.


The type of tide / current at this location.


The NOAA Station Id number for this location.


Select this button to search locations by name.


Enter the name of the location you wish to search for here.


Select this button to select a station by it's NOAA ID number.


Enter the NOAA ID number you wish to search for here.


Click this button to go back to a previous match.


Click this button to  advance to the next match.


Click this button to display the selected information


Click this button to exit the dialog without performing any actions


Click this button unselect all locations


Click this button display any notes associated with the last selected station


Click this button display more help about this dialog


The longitude you entered was invalid


The longitude you entered was had a bad direction specified


The longitude you entered was in an improper format


The longitude you entered was too large


Select a configuration category from the list


Select a configuration category from the list at the left


Important information


Important information


The size of the top margin


The size of the bottom margin


The size of the left margin


The size of the right margin


These settings determine the orientation of the printed page


A visual representation of the page orientation


Select this box to set the page orientation to Portrait


Select this box to set the page orientation to Landscape


The units the page margin is displayed in


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button for more information


These settings determine the margins of the printed page


This is the currently configured printer


This is the currently configured printer


Click this button to make the selected printer the default printer


This printer setup only affects Tides && Currents


Click this button to exit this dialog


Click this button to setup the selected printer


This is the currently configured printer


This is a list of available printers


This is the currently configured printer


This is the currently configured printer


Choose the type of report you wish


Choose the format of your report


This is the number of items selected to be printed


These are the locations that are available for printing


Check this box to print data based on the date displayed in the window


Select this button to print based on the range of dates displayed below


Enter the starting date of the range to print


Enter the starting date of the range to print


Enter the ending date of the range to print


Enter the ending date of the range to print


Check this box to print your reports in color


Click this button to print your reports


Click this button to preview your reports


Click this button to exit the dialog


Click this button to move the selected location up in the list


Click this button to move the selected location down in the list


Click this button to set various options regarding your reports


Click this button to make changes to the fonts used in the reports


Click this button to make changes to the page format


Click this button to make changes to the printer setup


Click this button for more information


This is the currently configured printer


These items determine the range of dates to be printed


This is the name of the currently configured printer


Check this box to print page numbers


Check this box to display a grid on your output


Check this box to print your report in color


Click this button to print your report


Click this button to exit this dialog


Click this button to set options regarding the output page


Click this button to set options regarding the printer


Click this button for more information


Click this button to preview your report


This is the name of the currently configured printer


This is the list of information currently shown in the real time display.


Click this button add a tide location to the list of displayed items


Click this button add a current location to the list of displayed items


Click this button to add a tide/current to the real time display from a list of open windows


Click this button to remove a selected entry from the list on the left.


Click this button to remove all entries from the list on the left.


Check to cause the real time window to always be displayed on top of other windows


Check to display information about the next tide or current change


Check to cause the real time window to appear in the last location it was placed


Enter how often you wish the real time window to be updated


This is a sample of the currently used font


Click this button to change the font used


Closes this dialog and saves any changes you have made.


Closes this dialog without saving any changes you have made.


Click this button for more information


Click this button to select a new font to be used for the date


This is a sample of the font that is currently selected


Select this box to have the program select the correct font


Select this box to use the specified font size


The name and point side of the font being used


Click this button to select a new font to be used for the title


This is a sample of the font that is currently selected


Select this box to have the program select the correct font


Select this box to use the specified font size


The name and point side of the font being used


Click this button to select a new font to be used for the main body of the report


This is a sample of the font that is currently selected


Select this box to have the program select the correct font


Select this box to use the specified font size


The name and point side of the font being used


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button to restore the default fonts


Click this button for more information


These are the fonts that are used when printing out reports


Check this box to include a grid on the report


Check this box to include daily information on the report


Choose the frequency of the daily detail


Check this box to include a sunrise / sunset information on the report


Check this box to include a sunrise / sunset shading on the report


Check this box to include a moonrise / moonset information on the report


Check this box to include a a graphic showing the phase of the moon


Choose the frequency of the moon graphic


Check this box to include range lines on the report


Check this box to include range line shading on the report


Check this box to include daily extreme information on the report


Choose the location of the extreme data


Check this box to include an area for notes on the report


Check this box to include the bitmap in the footer of the page


Choose the desired location for the bitmap


Enter the height of the bitmap


Enter the height of the bitmap


the units describing the height of the bitmap


The name of the bitmap file


The name of the bitmap file


Click this button to browse for the desired file


These settings control the printing of custom reports


Check this box to have each location printed on it's own page


The number of rows to be placed on the page


The number of rows to be placed on the page


The number of columns to be placed on the page


The number of columns to be placed on the page


A visual representation of the layout of the report


Select the desired resolution


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button for more information


A visual representation of the layout of the report


These selections control the general layout of the report


These selections control information regarding the placement of a bitmap on the report


Enter the desired name for your color scheme


Closes this dialog and saves any changes you have made.


Closes this dialog without saving any changes you have made.


Select this box to save the data to the Windows clipboard


Select this box to save the data to a file


Enter the name of the output file here


Select this button to save your data in DIF format


Select this button to save your data in SYLK format


Select this button to save your data in ASCII format


Specify the field delimiter for ASCII formatted files


Specify the field delimiter for ASCII formatted files


Specify the record delimiter for ASCII formatted files


Specify the record delimiter for ASCII formatted files


Important information


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button to choose a location for your output file


Click this button for more information


These values determine where to save your data


These values determine the format of the saved data


Important information


Choose a location from the list


Select the type of information you wish to search for


Select the type of information you wish to search for


Select the type of information you wish to search for


Enter the desired value


The units of the desired value


Specify the starting date


Specify the ending date


Check this box to specify a time range for your search


Select your start time


Select your start time


Select your ending time


Select your ending time


Check this button to specify particular days of the week


Check this button to select events on Sunday


Check this button to select events on Monday


Check this button to select events on Tuesday


Check this button to select events on Wednesday


Check this button to select events on Thursday


Check this button to select events on Friday


Check this button to select events on Saturday


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button for more information


Search progress


Search progress


These settings control the event search


Click this button to select a new font for the header of your table


This is a sample of the currently selected font


Click this button to select a new font for the main body of your table


This is a sample of the currently selected font


Check this box to save the above selection as the new system defaults


Closes this dialog and saves any changes you have made.


Closes this dialog without saving any changes you have made.


Select this box to select a location from one of the windows already opened


Select a location from one of the windows already opened


The latitude of the selected location


The latitude of the selected location


The longitude of the selected location


The longitude of the selected location


Select this button to enter a custom location to search from


The latitude to base the search from.


The latitude to base the search from.


The longitude to base the search from.


The longitude to base the search from.


Check this box to search for tide locations


Select the range from the initial location to search


Select the range from the initial location to search


Select the range from the initial location to search


Select this box to search all available tidal regions


Select this box to search a selected tidal region


Choose a tidal region from the list


Check this box to search for current locations


Select the range from the initial location to search


Select the range from the initial location to search


Select the range from the initial location to search


Select this box to search all available current regions


Select this box to search a selected current region


Choose a current region from the list


Information regarding the status of the search is displayed here


Information regarding the status of the search is displayed here


Click this button to perform the search


Click this button to exit this dialog


Click this button for more information


These are the notes


Closes this dialog and saves any changes you have made.


Closes this dialog without saving any changes you have made


Click this button to advance to the next set of notes for this location


Click this button for more information


Select this box to set the high range line based on the Mean Higher High Water level


Select this box to set the high range line based on the Mean tide level


Select this box to set the high range line based on a user defined value


Enter the height for a user defined high range value


Enter the height for a user defined high range value


The units the height is measured in


Enter the desired label for the high range line


Enter the desired label for the high range line


Select this box to set the low range line based on the Mean Lower Low Water level


Select this box to set the low range line based on a user defined level


Enter the height for a user defined low range value


Enter the height for a user defined low range value


The units the height is measured in


Enter the desired label for the low range line


Enter the desired label for the low range line


Closes this dialog and saves any changes you have made


Closes this dialog without saving any changes you have made


Click this button for more information


These values allow you to control the settings for the high range


These values allow you to control the settings for the low range


Important message


Click this button to exit the dialog


Click this button to select a new tide window


Click this button to select a new tide window


Click this button to select a new current window


Click this button to select a new current window


Click this button to open the locations displayed when you last exited the program


Click this button to open the locations displayed when you last exited the program


Click this button to select a group of locations to open.


Click this button to select a group of locations to open.


Check this box if you don't want to show this screen at startup.


Click this button to close the dialog without performing any other actions.


Welcome to Tides & Currents